/*
Navicat MySQL Data Transfer

Source Server         : local
Source Server Version : 50720
Source Host           : 127.0.0.1:3306
Source Database       : igds_api

Target Server Type    : MYSQL
Target Server Version : 50720
File Encoding         : 65001

Date: 2022-09-04 22:01:56
*/

SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for api_list
-- ----------------------------
DROP TABLE IF EXISTS `api_list`;
CREATE TABLE `api_list` (
  `ID_` int(11) NOT NULL AUTO_INCREMENT,
  `CATEGORY_` varchar(20) DEFAULT NULL,
  `CODE` varchar(20) DEFAULT NULL,
  `NAME` varchar(50) DEFAULT NULL,
  `FROM_G_` varchar(2) DEFAULT NULL,
  `FROM_P_` varchar(2) DEFAULT NULL,
  `FROM_C_` varchar(2) DEFAULT NULL,
  `VERSION_` varchar(10) DEFAULT NULL,
  `REMARK_` varchar(100) DEFAULT NULL,
  PRIMARY KEY (`ID_`)
) ENGINE=InnoDB AUTO_INCREMENT=41 DEFAULT CHARSET=utf8;

-- ----------------------------
-- Records of api_list
-- ----------------------------
INSERT INTO `api_list` VALUES ('1', '11', '1101', '单位信息数据接口', 'Y', 'Y', 'Y', 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('2', '11', '1102', '库区信息数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('3', '11', '1103', '仓房信息数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('4', '11', '1104', '廒间信息数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('5', '11', '1105', '货位信息数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('6', '11', '1106', '油罐信息数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('7', '11', '1107', '设备信息数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('8', '11', '1108', '药剂信息数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('9', '11', '1109', '文件信息数据接口', 'Y', 'Y', 'Y', 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('10', '11', '1110', '库区图仓房点位标注数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('11', '11', '1111', '库区图视频监控设备点位标注数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('12', '11', '1112', '人员信息数据接口', 'Y', 'Y', 'Y', 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('13', '11', '1113', '企业信用信息数据接口', null, 'Y', 'Y', 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('14', '12', '1201', '合同信息数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('15', '12', '1202', '粮食入库信息数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('16', '12', '1203', '粮食入库检验信息数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('17', '12', '1204', '粮食入库结算信息数据口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('18', '12', '1205', '粮食出库信息数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('19', '12', '1206', '粮食出库结算信息数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('20', '12', '1207', '倒仓信息数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('21', '12', '1208', '粮食库存数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('22', '12', '1209', '损溢单数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('23', '12', '1210', '粮食性质转变单数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('24', '12', '1211', '账面库存数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('25', '12', '1212', '客户信息数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('26', '13', '1301', '安全管理数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('27', '13', '1302', '温湿度检测数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('28', '13', '1303', '害虫检测数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('29', '13', '1304', '气体检测数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('30', '13', '1305', '通风作业数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('31', '13', '1306', '熏蒸作业数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('32', '13', '1307', '仓内视频图像数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('33', '13', '1308', '视频监控异常事件告警基本信息数据接口', 'Y', null, null, 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('34', '13', '1309', '违规预警信息数据接口', 'Y', 'Y', 'Y', 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('35', '13', '1310', '质检数据接口', 'Y', 'Y', 'Y', 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('36', '14', '1401', '储备规模数据接口', '', 'Y', 'Y', 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('37', '14', '1402', '储备计划信息数据接口', '', 'Y', 'Y', 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('38', '14', '1403', '轮换计划信息数据接口', '', 'Y', 'Y', 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('39', '14', '1404', '轮换计划明细信息数据接口', '', 'Y', 'Y', 'V-2022-09', null);
INSERT INTO `api_list` VALUES ('40', '14', '1405', '项目信息数据接口', '', 'Y', 'Y', 'V-2022-09', null);
